• Main results achieved:

• Detector fully debugged ⇒ OK!

• Transverse polarized hydrogen target up and running: P^↑ ≃ 82%

• Λ-wheel detector able to run with transverse target coil ON

• LPOL ⇒ OK!

• >200 runs collected • Alignment data collected

• Main problems:

• High background from radiation in the “top” detector: tuning of “bumps” 17-101 mt upstream.

• Main requests:

• Christmas break: no major work planned

• Shutdown in August:

• 2-3 fills for “parasitic” polarimeter studies • ... other request in the next Coordination Meeting according to the HERA performances.

Pasquale Di Nezza, HERA Coordination Meeting, 20/10/03