TPOL

LPOL

time in hours polarisation

TPOL

LPOL/TPOL

LPOL

LPOL/TPOL time in hours

LPOL/TPOL

121.6 / 75 Constant 66.39 Mean 1.072 Sigma 0.6576E-01

LPOL/TPOL

352.5 / 42 A0 1.036 A1 0.2422E-02

HERA current in mA

LPOL/TPOL

58.93 / 62 Constant 51.08 Mean -0.9711E-01 Sigma 0.9559

pull with scale factor 1.071

0 5 10 15 20 25 30 35 40

0 20 40 60

0.9 0.95 1 1.05 1.1 1.15

20 25 30 35 40

0.9 0.95 1 1.05 1.1 1.15

20 25 30 35 40

0 0.5 1 1.5

0 20 40 60 0 20 40 60 80

0.8 1 1.2 1.4

0.8 1 1.2 1.4

10 12 14 16 18 0 20 40 60

-2 0 2 4