0 1 2 3 4 5 6 7

125 150 175 200 225 250 275 300 325 350

H1 LUMI Online 2002(e^+)

HERA Delivered 6.84 pb^{-1} H1 Gated 5.62 pb^{-1} H1 Data Taken 5.30 pb^{-1}

Integr. Lumi pb^{-1}

Status 16.12.02

May June July August September October November December

Lumi per day nb^{-1}

Day of the year 2002 0 20 40 60 80 100 120 140 160 180

125 150 175 200 225 250 275 300 325 350