Data Taking: November/December

average positron current injected and ramped dropped back to ∼20 - 25 mA

Taken and to be taken Data

Detector in good shape to take data Small problem with polarised target solved; cost only one fill Projected DIS at time of Nov. Coord. meeting: 1.25 Million Projected DIS now: 0.90 Million −→ Please increase positron current

Requests

Need higher average positron currents to get the 1.4 Million DIS till March

regular injection currents of ∼30 - 35 mA or machine operation in non colliding mode to allow faster turn on Studies for the depolarising resonances are mainly done Needed once more 30 mA ramped before Christmas to do a magnetic field scan, can be done completely parasitic Detector stays in interlock during the Christmas break Ready for data taking at the 2nd of January

No changes in the planning for the 3-4 month shutdown