[%] eP -100 -50 0 50 100

[pb] CCσ

0

20

40

60

80

100

120 p Scattering ± HERA Charged Current e

2 > 400 GeV 2Q y < 0.9

Xν→p ^+e

Xν→p e

HERAPDF 1.5

HERAPDF 1.5

H1 ZEUS

H1 ZEUS