HERA inclusive diffracfion

Q^2 (GeV^2)

3^l*x_{IP}σ_r^{D(3)}

H1 LRG (M_N=1.6 GeV) H1 Fit B H1 Fit B (extrapolated)

x_{IP}=0.03

β=0.0017 (l=13) β=0.0027 (l=12) β=0.00042 (l=11) β=0.0067 (l=10) β=0.011 (l=9) β=0.017 (l=8) β=0.027 (l=7) β=0.043 (l=6) β=0.067 (l=5) β=0.11 (l=4)

β=0.17 (l=3)

β=0.27 (l=2) β=0.43 (l=1) β=0.67 (l=0)

10^{-2}

10^{-1}

1

10

10^2

10^3

10^4

10^5

10 10^2 10^3