HERA inclusive diffracfion

Q^2 (GeV^2)

4^l*x_{IP}σ_r^{D(3)}

ZEUS LRG (M_N=1.6 GeV)x0.87 H1 LRG (M_N=1.6 GeV) H1 Fit B H1 Fit B (extrapolated)

x_{IP}=0.0003

β=0.267 (l=2)

β=0.433 (l=1)

β=0.667 (l=0)

10^{-1}

1

10 10^2