SESSION 6: SUMMARIES Invited Summary Talk – 02 Fri, Oct 5, 01 15:00 – 15:50

Recommendations for Building and Testing the Next Generation of Gaseous Detectors

Bernhard Schmidt

Deutsches Elektronensynchrotron (DESY), 22603 Hamburg, Germany