Cathode dark current history

0

                                                                                                                200

                                                                                                                400

                                                                                                                600

                                                                                                                800

                                                                                                      1000

                                                                                                      1200

                                                                                                      1400

                                                                                                      1600

                                                                                                      1800

                                                                                                      2000

11/98 12/98 02/99 03/99 05/99 07/99 08/99 10/99 12/99 01/00 03/00 05/00 06/00 08/00 10/00 11/00 01/01 02/01 04/01

Time

Dark current (

A)

1st 13

12 21

22 23

33 36

50