Cathode 22

0

200

400

600

800

1000

1200

1400

1600

4/2/00 14/2/00 24/2/00 5/3/00 15/3/00 25/3/00 4/4/00 14/4/00 24/4/00

Time

Dark Current (

A)

Fired TSPs