Cathode 21

0

2000

4000

6000

8000

10000

12000

14000

16000

10/3/00 15/3/00 20/3/00 25/3/00 30/3/00 4/4/00 9/4/00 14/4/00

Time

Dark current (

A)Mirrors exchange

Halle 3 power failure