Cathode 13

0

200

400

600

800

1000

1200

1400

19/2/99 21/3/99 20/4/99 20/5/99 19/6/99 19/7/99 18/8/99 17/9/99 17/10/99 16/11/99

Time

Darkcurrent ( mA)

   Shut Down

Couplers
conditioning