1 st cathode

0

200

400

600

800

1000

1200

1400

1600

1800

1/12/98 11/12/98 21/12/98 31/12/98 10/1/99 20/1/99 30/1/99 9/2/99 19/2/99 1/3/99 11/3/99 21/3/99

Time

Dark current (

A)