divergence ΜμradΝ correction factor A_0/A divergence ΜμradΝ focus size ΜmmΝ

0.98 1 1.02

1.04

1.06

1.08 1.1 1.12

1.14

5 10 0.4 0.45 0.5 0.55 0.6

5 10