Mean RMS 1.095 0.7305E-01

ratio LPOL/TPOL

Mean RMS 0.9993 0.5752E-01

ratio LPOL/TPOL with lin. focus corr

focus in mm ratio LPOL/TPOL

non-colliding bunches colliding bunches

0 200 400 600 800 1000

1200

1400

1600

1800

0.6 0.8 1 1.2 1.4 0 500 1000

1500

2000

2500

0.6 0.8 1 1.2 1.4

0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4

0.45 0.5 0.55 0.6 0.65 0.7 0.75