1174.38 1174.39 1174.4 1174.41 1174.42 1174.43 6 10× 25

30

35

40

45

50

Time

0700 0900 1100 1300 1500 1700 1900 2100 2300 0100

Pol

TPOL Av LPOL Av Cavity Av

Time

0700 0900 1100 1300 1500 1700 1900 2100 2300 0100

Ratio (5 Mins)

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2

LPOL/TPOL Cavity/TPOL

LPOL/TPOL

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 0

100

200

300

400

500

LPOLTPOLHist Entries 2691 Mean 0.9916 RMS 0.02509

Cavity/TPOL

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 0

50

100

150

200

250

300

CavityTPOLHist Entries 1509 Mean 0.9682 RMS 0.03158

1174.38 1174.39 1174.4 1174.41 1174.42 1174.43 6 10× 30 35 40 45 50 55 60 65 70

Time

0700 0900 1100 1300 1500 1700 1900 2100 2300 0100

Pol

TPOL Coll TPOL NonColl Cavity Coll Cavity NonColl

Time

0700 0900 1100 1300 1500 1700 1900 2100 2300 0100

Ratio (5 Mins)

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 Cavity/TPOL Coll

Cavity/TPOL NonColl

Cavity/TPOL (Coll)

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 0

50

100

150

200

250

300 CavityTPOLCollHist Entries 1526 Mean 0.9737 RMS 0.03461

Cavity/TPOL (NonColl)

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 0

20

40

60

80

100

CavityTPOLNonCollHist Entries 1098 Mean 0.9494 RMS 0.05043