1174.31 1174.32 1174.33 1174.34 1174.35 1174.36 6 10× 0

10

20

30

40

50

Time

1300 1500 1700 1900 2100 2300 0100 0300 0500

Pol

0 0

TPOL Av LPOL Av Cavity Av

Time

1300 1500 1700 1900 2100 2300 0100 0300 0500

Ratio (5 Mins)

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2

LPOL/TPOL Cavity/TPOL

LPOL/TPOL

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 0

100

200

300

400

500

600

LPOLTPOLHist Entries 3171 Mean 1.024 RMS 0.0324

Cavity/TPOL

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 0

5

10

15

20

25

CavityTPOLHist Entries 163 Mean 0.9776 RMS 0.08729

1174.31 1174.32 1174.33 1174.34 1174.35 1174.36 6 10× 0 10 20 30 40 50 60 70

Time

1300 1500 1700 1900 2100 2300 0100 0300 0500

Pol

0 0

TPOL Coll TPOL NonColl Cavity Coll Cavity NonColl

Time

1300 1500 1700 1900 2100 2300 0100 0300 0500

Ratio (5 Mins)

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 Cavity/TPOL Coll

Cavity/TPOL NonColl

Cavity/TPOL (Coll)

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 0

5

10

15

20

25

30 CavityTPOLCollHist Entries 183 Mean 0.987 RMS 0.08832

Cavity/TPOL (NonColl)

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 0 1 2

3 4 5 6 7

CavityTPOLNonCollHist Entries 65 Mean 1.023 RMS 0.1262