1173.975 1173.98 1173.985 1173.99 1173.995 6 10× 15

20

25

30

35

40

45

Time

1700 1800 1900 2000 2100 2200

Pol

TPOL Av LPOL Av Cavity Av

Time

1700 1800 1900 2000 2100 2200

Ratio (5 Mins)

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2

LPOL/TPOL Cavity/TPOL

LPOL/TPOL

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 0

20

40

60

80

100

120 LPOLTPOLHist Entries 1082 Mean 0.9884 RMS 0.03864

Cavity/TPOL

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 0 10 20 30 40 50 60 70

CavityTPOLHist Entries 363 Mean 0.9737 RMS 0.03076

1173.975 1173.98 1173.985 1173.99 1173.995 6 10× 10

20

30

40

50

60

70

Time

1700 1800 1900 2000 2100 2200

Pol

TPOL Coll TPOL NonColl Cavity Coll Cavity NonColl

Time

1700 1800 1900 2000 2100 2200

Ratio (5 Mins)

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 Cavity/TPOL Coll

Cavity/TPOL NonColl

Cavity/TPOL (Coll)

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 0 10 20 30 40 50 60 70 CavityTPOLCollHist Entries 363 Mean 0.9753 RMS 0.03204

Cavity/TPOL (NonColl)

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 0 2 4 6 8 10 12 14 16 18 20 22

CavityTPOLNonCollHist Entries 330 Mean 0.9648 RMS 0.07013