dca(CJC-CST)

64.15 / 37 Constant 163.7 4.585 Mean -0.1741E-02 0.4565E-03 Sigma 0.2088E-01 0.3730E-03

2001/04/11 16.47

1/pt(CJC-CST)

46.97 / 40 Constant 154.0 4.275 Mean 0.4863E-03 0.1207E-03 Sigma 0.5579E-02 0.9670E-04

dca(CST-CST), NCST.GE.1

68.25 / 36 Constant 220.4 6.225 Mean -0.1630E-03 0.6893E-04 Sigma 0.3238E-02 0.5980E-04

1/pt(CST-CST), NCST.GE.1

48.99 / 39 Constant 160.0 4.295 Mean 0.1753E-03 0.4795E-04 Sigma 0.2258E-02 0.3777E-04

dca(CST-CST), NCST.GE.2

35.13 / 21 Constant 60.81 3.322 Mean -0.2271E-03 0.1243E-03 Sigma 0.2769E-02 0.9269E-04

1/pt(CST-CST), NCST.GE.2

30.11 / 31 Constant 39.17 2.122 Mean 0.2439E-03 0.9633E-04 Sigma 0.2166E-02 0.7070E-04