dca(CJC-CST)

72.82 / 37 Constant 162.3 4.517 Mean -0.2811E-02 0.4563E-03 Sigma 0.2094E-01 0.3624E-03

2001/04/11 17.46

1/pt(CJC-CST)

59.49 / 41 Constant 152.4 4.299 Mean 0.8012E-03 0.1218E-03 Sigma 0.5614E-02 0.1011E-03

dca(CST-CST), NCST.GE.1

81.11 / 37 Constant 199.4 5.648 Mean -0.2067E-02 0.7567E-04 Sigma 0.3560E-02 0.6595E-04

1/pt(CST-CST), NCST.GE.1

47.20 / 41 Constant 156.1 4.219 Mean 0.5733E-03 0.4876E-04 Sigma 0.2313E-02 0.3889E-04

dca(CST-CST), NCST.GE.2

36.06 / 24 Constant 58.24 3.268 Mean -0.2372E-02 0.1274E-03 Sigma 0.2879E-02 0.1013E-03

1/pt(CST-CST), NCST.GE.2

40.66 / 30 Constant 37.93 2.106 Mean 0.5723E-03 0.9939E-04 Sigma 0.2198E-02 0.7677E-04