dca(CJC-CST)

43.77 / 37 Constant 151.6 4.241 Mean -0.7725E-02 0.4954E-03 Sigma 0.2274E-01 0.4069E-03

2001/04/11 17.13

1/pt(CJC-CST)

82.78 / 41 Constant 141.5 3.971 Mean 0.1735E-02 0.1308E-03 Sigma 0.5963E-02 0.1041E-03

dca(CST-CST), NCST.GE.1

67.65 / 39 Constant 192.3 5.451 Mean -0.2024E-02 0.7849E-04 Sigma 0.3708E-02 0.6886E-04

1/pt(CST-CST), NCST.GE.1

50.24 / 41 Constant 151.3 4.057 Mean 0.4786E-03 0.5036E-04 Sigma 0.2380E-02 0.3923E-04

dca(CST-CST), NCST.GE.2

28.50 / 24 Constant 57.33 3.191 Mean -0.2288E-02 0.1327E-03 Sigma 0.2979E-02 0.1067E-03

1/pt(CST-CST), NCST.GE.2

32.33 / 30 Constant 37.16 2.075 Mean 0.5310E-03 0.1027E-03 Sigma 0.2280E-02 0.8261E-04