RMS(dca) vs pt

24.46 / 4 P1 248.5 2.299 P2 556.8 10.85

2000/11/28 16.56

RMS(Phi0) vs pt

14.65 / 4 P1 1.089 0.1301E-01 P2 4.118 0.6672E-01

RMS(1/pt) vs pt

5.583 / 4 P1 0.6025 0.6507E-02 P2 1.969 0.3438E-01