Data Taking: August

2002 August Polarized DIS: 35100. 2002 August Unpolarized DIS: 0. before 2002 August Polarized DIS: 35900. before 2002 August Unpolarized DIS: 111700.

Data Taking: September

2002 September Polarized DIS: 109800 2002 September Unpolarized DIS: 98060

Total 2002 Polarized DIS: 180800 without DQ Total 2002 Unpolarized DIS: 209700 without DQ

What does HERMES need

Need 1.4 Million DIS before data-quality Current Data rate: 70 DIS / mA h

−→ 20 Ah

Conclusion

HERMES ready for data taking since months

HERMES requests ∼ 20 Ah of beam on polarised target before the shutdown

If Lumi-running in colliding mode:

request priority for HERA-B / HERMES to determine running conditions −→ rotate coordinating experiment between those two ?

HERMES needs a 3 month shutdown end of 2004 to install the recoil detector −→ change between electrons and positrons required after 2005.