HERMES Status and Plans

Maurice Bouwhuis University of Illinois at Urbana-Champaign

Beam Loss Monitor Shutdown Plans Data Taking Requests

M. Bouwhuis @ Hera Coordination September 2002 – p.1/3

Beam Loss Monitor

BLM connected to the e Dump Kicker To the best of our knowledge only "sympathetic" firings.

M. Bouwhuis @ Hera Coordination September 2002 – p.2/3

Shutdown Plans

Survey and Alignment 1 week

After alignment of beamline in 2000, put target chamber and pumpcross on axis

Transverse Target Magnet 6 weeks

Remap T-magnet in Hall-II Possibly re-homogenize central field

Modification of Lambda Wheel Modules 2 weeks

Remove incompatibility of LW-Electronics with the T-magnet.

Maintenance and small modifications - weeks

Maintenance of Pumps Replacement of flanges Repair of target sampling tube ....^{M. Bouwhuis @ Hera Coordination September 2002 – p.3/3}